Meta> .run lr_history

% Compiled module: LR_HISTORY.

Meta> lr_history, ’*’,960415.

found 213 files

ME1415.960415093423.dat: 960415.40 T= 23.3, H= 21.

ME1458.960415100954.dat: 960415.42 T= 23.3, H= 21.

ME1464.960415104657.dat: 960415.45 T= 23.3, H= 21.

ME1465.960415110935.dat: 960415.46 T= 23.9, H= 21.

HA2015.960415113953.dat: 960415.49 T= 23.9, H= 21.

ME1471.960415125235.dat: 960415.54 T= 24.4, H= 20.

ME1470.960415134211.dat: 960415.57 T= 24.4, H= 20.

ME1451.960415141248.dat: 960415.59 T= 24.4, H= 20.

ME1462.960415145127.dat: 960415.62 T= 24.4, H= 20.

ME1439.960415152529.dat: 960415.64 T= 24.4, H= 20.

ME1435.960416080720.dat: 960416.34 T= 23.9, H= 26.

ME1435.960416095419.dat: 960416.41 T= 23.9, H= 26.

ME1462.960416103021.dat: 960416.44 T= 23.9, H= 26.

ME1439.960416121242.dat: 960416.51 T= 23.9, H= 26.

ME1471.960416130716.dat: 960416.55 T= 23.9, H= 26.

ME1470.960416133459.dat: 960416.57 T= 23.9, H= 26.

ME1451.960416135929.dat: 960416.58 T= 23.9, H= 26.

ME1451.960417110531.dat: 960417.46 T= 23.9, H= 20.

ME1471.960417125057.dat: 960417.53 T= 23.9, H= 20.

ME1435.960417133147.dat: 960417.56 T= 23.9, H= 20.

ME1470.960417141115.dat: 960417.59 T= 23.9, H= 20.

ME1462.960417145246.dat: 960417.62 T= 23.9, H= 20.

ME1439.960417153422.dat: 960417.65 T= 23.9, H= 20.

HA2004.960418120318.dat: 960418.50 T= 24.4, H= 18.

HA2028.960418123150.dat: 960418.52 T= 24.4, H= 18.

HA2010.960418130707.dat: 960418.55 T= 24.4, H= 18.

HA2007.960418133852.dat: 960418.57 T= 24.4, H= 18.

MA1026.960419071505.dat: 960419.30 T= 23.3, H= 23.

MA1022.960419074038.dat: 960419.32 T= 23.3, H= 23.

ME1445.960419081743.dat: 960419.35 T= 23.3, H= 23.

ME1446.960419084336.dat: 960419.36 T= 23.3, H= 23.

ME1447.960419090725.dat: 960419.38 T= 23.3, H= 23.

ME1453.960419093641.dat: 960419.40 T= 23.3, H= 23.

ME1445.960419101157.dat: 960419.42 T= 23.3, H= 23.

ME1446.960419103633.dat: 960419.44 T= 23.3, H= 23.

ME1447.960419113441.dat: 960419.48 T= 23.3, H= 23.

ME1453.960419120845.dat: 960419.51 T= 23.3, H= 23.

ME1456.960419125214.dat: 960419.54 T= 24.4, H= 26.

ME1459.960419134736.dat: 960419.57 T= 24.4, H= 26.

ME1456.960419144331.dat: 960419.61 T= 24.4, H= 26.

ME1459.960419150945.dat: 960419.63 T= 24.4, H= 26.

ME1445.960420102454.dat: 960420.43 T= 23.9, H= 33.

ME1446.960420104938.dat: 960420.45 T= 23.9, H= 33.

ME1447.960420112133.dat: 960420.47 T= 23.9, H= 33.

ME1453.960420114642.dat: 960420.49 T= 23.9, H= 33.

ME1456.960422081737.dat: 960422.35 T= 21.7, H= 33.

ME1459.960422090556.dat: 960422.38 T= 21.7, H= 33.

HF2517.960422095329.dat: 960422.41 T= 21.7, H= 33.

HF2509.960422102654.dat: 960422.43 T= 21.7, H= 33.

HF2510.960422120953.dat: 960422.51 T= 21.7, H= 33.

HF2500.960422134939.dat: 960422.58 T= 21.7, H= 33.

HF2517.960422145119.dat: 960422.62 T= 21.7, H= 33.

HF2500.960422151517.dat: 960422.64 T= 21.7, H= 33.

HF2509.960422154023.dat: 960422.65 T= 21.7, H= 33.

HF2510.960422160751.dat: 960422.67 T= 21.7, H= 33.

HF2504.960422170736.dat: 960422.71 T= 21.7, H= 33.

HF2509.960423133342.dat: 960423.56 T= 21.7, H= 47.

HF2510.960423140810.dat: 960423.59 T= 21.7, H= 47.

HF2500.960423144524.dat: 960423.61 T= 21.7, H= 47.

HF2517.960423151443.dat: 960423.63 T= 21.7, H= 47.

HF2516.960424111635.dat: 960424.47 T= 23.3, H= 26.

HF2504.960424113922.dat: 960424.49 T= 23.3, H= 26.

HF2509.960424133849.dat: 960424.57 T= 23.3, H= 26.

HF2505.960424141424.dat: 960424.59 T= 23.3, H= 26.

HF2512.960424143659.dat: 960424.61 T= 23.3, H= 26.

HF2508.960424150502.dat: 960424.63 T= 23.3, H= 26.

HF2506.960424153302.dat: 960424.65 T= 23.3, H= 26.

HF2505.960424163627.dat: 960424.69 T= 23.3, H= 26.

HF2506.960424170214.dat: 960424.71 T= 23.3, H= 26.

HF2508.960424172952.dat: 960424.73 T= 23.3, H= 26.

HF2512.960424175602.dat: 960424.75 T= 23.3, H= 26.

HF2517.960425094639.dat: 960425.41 T= 24.4, H= 23.

HF2517.960425115605.dat: 960425.50 T= 22.8, H= 24.

HF2509.960425150247.dat: 960425.63 T= 22.8, H= 24.

HF2504.960425152432.dat: 960425.64 T= 22.8, H= 24.

HF2506.960425155612.dat: 960425.66 T= 22.8, H= 24.

HF2505.960425163156.dat: 960425.69 T= 22.8, H= 24.

HF2508.960427112159.dat: 960427.47 T= 21.7, H= 30.

HF2512.960427114946.dat: 960427.49 T= 21.7, H= 30.

HF2515.960429111353.dat: 960429.47 T= 24.4, H= 28.

HF2503.960429114004.dat: 960429.49 T= 24.4, H= 28.

HF2507.960429131346.dat: 960429.55 T= 24.4, H= 28.

HF2511.960429134713.dat: 960429.57 T= 24.4, H= 28.

HF2515.960429145344.dat: 960429.62 T= 24.4, H= 28.

HF2511.960429163019.dat: 960429.69 T= 24.4, H= 28.

HF2507.960429165550.dat: 960429.70 T= 24.4, H= 28.

HF2503.960429171637.dat: 960429.72 T= 24.4, H= 28.

HF2515.960429173900.dat: 960429.74 T= 24.4, H= 28.

HF2515.960430142936.dat: 960430.60 T= 23.3, H= 35.

HF2503.960430152944.dat: 960430.65 T= 23.3, H= 35.

HF2511.960430161107.dat: 960430.67 T= 23.3, H= 35.

HF2507.960430165632.dat: 960430.71 T= 24.4, H= 50.

HF2519.960501140552.dat: 960501.59 T= 21.7, H= 25.

HF2544.960501142718.dat: 960501.60 T= 21.7, H= 25.

HF2543.960501145013.dat: 960501.62 T= 21.7, H= 25.

HF2542.960501152542.dat: 960501.64 T= 21.7, H= 25.

HF2532.960501155442.dat: 960501.66 T= 21.7, H= 25.

HF2549.960501161854.dat: 960501.68 T= 21.7, H= 25.

HF2543.960502092632.dat: 960502.39 T= 21.7, H= 30.

HF2519.960502100814.dat: 960502.42 T= 21.7, H= 30.

HF2544.960502104303.dat: 960502.45 T= 21.7, H= 30.

HF2549.960502113554.dat: 960502.48 T= 21.7, H= 30.

HF2532.960502131609.dat: 960502.55 T= 21.7, H= 30.

HF2542.960502133908.dat: 960502.57 T= 21.7, H= 30.

HF2536.960503095937.dat: 960503.42 T= 21.7, H= 25.

HF2537.960503105520.dat: 960503.45 T= 21.7, H= 25.

HF2519.960503114307.dat: 960503.49 T= 21.7, H= 25.

HF2532.960503132444.dat: 960503.56 T= 21.7, H= 25.

HF2542.960503141208.dat: 960503.59 T= 21.7, H= 25.

HF2543.960503143312.dat: 960503.61 T= 21.7, H= 25.

HF2544.960503150809.dat: 960503.63 T= 21.7, H= 25.

HF2549.960503154544.dat: 960503.66 T= 21.7, H= 25.

HF2540.960506103158.dat: 960506.44 T= 23.3, H= 29.

HF2541.960506105619.dat: 960506.46 T= 23.3, H= 29.

HF2547.960506111847.dat: 960506.47 T= 23.3, H= 29.

HF2533.960506114050.dat: 960506.49 T= 23.3, H= 29.

HF2533.960506133928.dat: 960506.57 T= 23.3, H= 29.

HF2536.960506144553.dat: 960506.61 T= 23.3, H= 29.

HF2537.960506152008.dat: 960506.64 T= 23.3, H= 29.

HF2540.960506155145.dat: 960506.66 T= 23.3, H= 29.

HF2541.960506161400.dat: 960506.68 T= 23.3, H= 29.

HF2547.960506165847.dat: 960506.71 T= 23.3, H= 29.

HF2540.960507134718.dat: 960507.57 T= 21.7, H= 19.

HF2541.960507141217.dat: 960507.59 T= 21.7, H= 19.

LM0311.960507145453.dat: 960507.62 T= 21.7, H= 17.

LM0312.960507153625.dat: 960507.65 T= 21.7, H= 17.

LM0313.960507161104.dat: 960507.67 T= 21.7, H= 17.

HF2533.960508133212.dat: 960508.56 T= 22.8, H= 34.

HF2547.960508135829.dat: 960508.58 T= 22.8, H= 34.

HF2536.960508142301.dat: 960508.60 T= 22.8, H= 34.

HF2537.960508144319.dat: 960508.61 T= 22.8, H= 34.

HF2554.960509085237.dat: 960509.37 T= 24.4, H= 30.

HF2530.960509091720.dat: 960509.39 T= 24.4, H= 30.

HF2556.960509094837.dat: 960509.41 T= 24.4, H= 30.

HF2555.960509101703.dat: 960509.43 T= 24.4, H= 30.

HF2558.960509104139.dat: 960509.45 T= 24.4, H= 30.

HF2518.960509110611.dat: 960509.46 T= 24.4, H= 30.

HF2530.960509141515.dat: 960509.59 T= 24.4, H= 33.

HF2558.960509144545.dat: 960509.61 T= 24.4, H= 33.

HF2518.960509152635.dat: 960509.64 T= 24.4, H= 33.

HF2554.960509160654.dat: 960509.67 T= 24.4, H= 33.

HF2555.960509162809.dat: 960509.69 T= 24.4, H= 33.

HF2556.960509165433.dat: 960509.70 T= 24.4, H= 33.

HF2518.960510134328.dat: 960510.57 T= 23.9, H= 35.

HF2558.960510141029.dat: 960510.59 T= 23.9, H= 35.

HF2530.960510144238.dat: 960510.61 T= 23.9, H= 35.

HF2556.960510153144.dat: 960510.65 T= 23.9, H= 35.

HF2555.960510160231.dat: 960510.67 T= 23.9, H= 35.

HF2554.960510162512.dat: 960510.68 T= 23.9, H= 35.

HF2529.960510171809.dat: 960510.72 T= 23.9, H= 35.

HE2427.960512165735.dat: 960512.71 T= 23.3, H= 27.

HE2427.960512175217.dat: 960512.74 T= 23.3, H= 27.

HF2529.960512181323.dat: 960512.76 T= 23.3, H= 27.

HF2553.960513093431.dat: 960513.40 T= 23.3, H= 23.

HE2422.960513102027.dat: 960513.43 T= 23.3, H= 23.

HE2421.960513104514.dat: 960513.45 T= 23.3, H= 23.

HE2426.960513111650.dat: 960513.47 T= 23.3, H= 23.

HF2520.960513114901.dat: 960513.49 T= 23.3, H= 23.

HF2551.960513125428.dat: 960513.54 T= 23.3, H= 23.

HE2421.960513132916.dat: 960513.56 T= 23.3, H= 23.

HE2422.960513135210.dat: 960513.58 T= 23.3, H= 23.

HE2426.960513142439.dat: 960513.60 T= 23.3, H= 23.

HF2529.960513150051.dat: 960513.62 T= 23.3, H= 23.

HE2427.960513152320.dat: 960513.64 T= 23.3, H= 23.

HF2551.960513155622.dat: 960513.66 T= 23.3, H= 23.

HF2520.960513163140.dat: 960513.69 T= 23.3, H= 23.

HF2553.960513171335.dat: 960513.72 T= 23.3, H= 23.

HF2525.960514140415.dat: 960514.59 T= 22.8, H= 15.

HE2421.960514143731.dat: 960514.61 T= 22.8, H= 15.

HE2422.960514151213.dat: 960514.63 T= 22.8, H= 15.

HF2553.960514154558.dat: 960514.66 T= 22.8, H= 15.

HF2520.960514163143.dat: 960514.69 T= 24.4, H= 15.

HE2426.960514170103.dat: 960514.71 T= 24.4, H= 15.

HF2551.960514172323.dat: 960514.72 T= 24.4, H= 15.

HF2528.960515093941.dat: 960515.40 T= 22.8, H= 21.

HF2526.960515100617.dat: 960515.42 T= 22.8, H= 21.

MA1011.960515145026.dat: 960515.62 T= 22.8, H= 19.

MA1009.960515152309.dat: 960515.64 T= 22.8, H= 19.

MA1012.960515155120.dat: 960515.66 T= 22.8, H= 19.

HE2414.960516103241.dat: 960516.44 T= 22.2, H= 24.

HC2201.960516113516.dat: 960516.48 T= 22.2, H= 24.

HC2204.960516125803.dat: 960516.54 T= 22.2, H= 24.

MA1006.960516135433.dat: 960516.58 T= 22.8, H= 36.

MA1000.960516144100.dat: 960516.61 T= 22.2, H= 24.

HF2525.960516155545.dat: 960516.66 T= 22.2, H= 24.

HF2528.960516162550.dat: 960516.68 T= 22.2, H= 24.

HF2525.960517141910.dat: 960517.60 T= 23.3, H= 37.

HF2526.960517153030.dat: 960517.65 T= 23.3, H= 37.

HF2528.960517160156.dat: 960517.67 T= 23.3, H= 37.

HE2423.960518103619.dat: 960518.44 T= 23.3, H= 38.

MD1357.960518111554.dat: 960518.47 T= 23.3, H= 38.

MD1372.960518113939.dat: 960518.49 T= 23.3, H= 38.

HE2423.960518120519.dat: 960518.50 T= 23.3, H= 38.

MD1357.960518123011.dat: 960518.52 T= 23.3, H= 38.

MD1372.960518125939.dat: 960518.54 T= 23.3, H= 38.

HE2423.960519114506.dat: 960519.49 T= 22.2, H= 46.

HE2424.960520111755.dat: 960520.47 T= 21.7, H= 49.

HE2425.960520120301.dat: 960520.50 T= 21.7, H= 49.

HE2428.960520140856.dat: 960520.59 T= 21.7, H= 49.

HE2429.960520150808.dat: 960520.63 T= 21.7, H= 49.

HE2430.960520153321.dat: 960520.65 T= 21.7, H= 49.

MD1357.960520161258.dat: 960520.68 T= 21.7, H= 49.

MD1372.960520163831.dat: 960520.69 T= 21.7, H= 49.

HE2424.960520171743.dat: 960520.72 T= 22.2, H= 41.

HE2425.960520175803.dat: 960520.75 T= 22.2, H= 41.

HE2428.960520181827.dat: 960520.76 T= 22.2, H= 41.

HE2429.960520185338.dat: 960520.79 T= 22.2, H= 41.

HE2430.960520194209.dat: 960520.82 T= 22.2, H= 41.

HE2424.960521161950.dat: 960521.68 T= 22.8, H= 46.

HE2425.960521170224.dat: 960521.71 T= 22.8, H= 46.

HE2428.960522100133.dat: 960522.42 T= 22.2, H= 46.

HE2429.960522104140.dat: 960522.45 T= 22.2, H= 46.

HE2430.960522112223.dat: 960522.47 T= 22.2, H= 46.