\batchmode







\documentclass[12pt]{article}
\usepackage[dvips]{graphics}

%
\usepackage{changemargin}
\usepackage{fullpage}  %
\usepackage{fancyhdr}
\pagestyle{fancy}


%


\lhead{HEAD-CC-3}
\rhead{AXAF Dispersive Spectroscopy Pipelines}
\lfoot{98 Dec 11}
\rfoot{D.P. Huenemoerder}


\makeatother
\newenvironment{tex2html_wrap}{}{}
\newwrite\lthtmlwrite
\def\lthtmltypeout#1{{\let\protect\string\immediate\write\lthtmlwrite{#1}}}%
\newbox\sizebox
\begin{document}
\pagestyle{empty}
{\newpage
\clearpage
\samepage \begin{changemargin}{-1in}{-1in}
    
    \begin{center}
      \fbox{\vbox{
      {
      \vspace*{0.1in}
      \huge\bf AXAF Science Center}

      \leavevmode{\scalebox{0.3}{\includegraphics{asc_logo.eps}}}
      \vspace*{-0.14in}
      \hrule
      \vspace*{0.1in}
      
      {\LARGE\bf HEAD-CC-3}

      \vspace*{0.1in}
      {\Large\bf  1998 December 11 }

      \vspace*{0.1in}
      {\LARGE\bf AXAF Dispersive Spectroscopy Pipeline Overview}

      \vspace*{0.1in}
      {\large\bf David Huenemoerder}

      \vspace*{0.1in}

      }}
\end{center}
  \end{changemargin}
}

\stepcounter{section}
\stepcounter{section}
\stepcounter{section}
{\newpage
\clearpage
\samepage \begin{centering}\leavevmode{
\rotatebox{90}{
\scalebox{1.05}{\includegraphics{./Ps/Field_AS6.eps}}}
}
\end{centering}
}

{\newpage
\clearpage
\samepage \begin{centering}\leavevmode{
\rotatebox{90}{
\scalebox{1.1}{\includegraphics{./Ps/Zoom_zo_regions.eps}}}
}
\end{centering}
}

{\newpage
\clearpage
\samepage \begin{centering}\leavevmode{
\rotatebox{90}{
\scalebox{1.1}{\includegraphics{./Ps/PI_AS6_wf.eps}}}
}
\end{centering}
}

{\newpage
\clearpage
\samepage \begin{centering}\leavevmode{
\rotatebox{90}{
\scalebox{1.1}{\includegraphics{./Ps/PI_AS6.eps}}}
}
\end{centering}
}

{\newpage
\clearpage
\samepage \begin{centering}\leavevmode{
\rotatebox{90}{
\scalebox{1.1}{\includegraphics{./Ps/WPI_AS6_wf.eps}}}
}
\end{centering}
}

{\newpage
\clearpage
\samepage \setbox\sizebox=\hbox{$TG\_R, TG\_D$}\lthtmltypeout{latex2htmlSize :tex2html_wrap_inline221: \the\ht\sizebox::\the\dp\sizebox.}\box\sizebox
}

{\newpage
\clearpage
\samepage \begin{centering}\leavevmode{
\rotatebox{90}{
\scalebox{1.1}{\includegraphics{./Ps/Disp_AS6_int.eps}}}
}
\end{centering}
}

{\newpage
\clearpage
\samepage \begin{centering}\leavevmode{
\rotatebox{90}{
\scalebox{1.1}{\includegraphics{./Ps/Disp_AS6_phot.eps}}}
}
\end{centering}
}

{\newpage
\clearpage
\samepage \begin{centering}\rotatebox{90}{
\leavevmode{\scalebox{0.90}{\includegraphics{./Ps/Sp_AS6_s1.eps}}}
}
\end{centering}
}

{\newpage
\clearpage
\samepage \setbox\sizebox=\hbox{$\lambda-\lambda_\mathrm{true}$}\lthtmltypeout{latex2htmlSize :tex2html_wrap_inline223: \the\ht\sizebox::\the\dp\sizebox.}\box\sizebox
}

{\newpage
\clearpage
\samepage \setbox\sizebox=\hbox{$1/2$}\lthtmltypeout{latex2htmlSize :tex2html_wrap_inline229: \the\ht\sizebox::\the\dp\sizebox.}\box\sizebox
}

{\newpage
\clearpage
\samepage \begin{centering}\leavevmode{
\rotatebox{90}{
\scalebox{1.0}{\includegraphics{./Ps/Wavresid_MEG_1.ps}}}
}
\end{centering}
}

{\newpage
\clearpage
\samepage \begin{centering}\leavevmode{
\rotatebox{180}{
\scalebox{0.8}{\includegraphics{./Ps/Wave_comp_980722.ps}}}
}
\end{centering}
}

\stepcounter{section}
\stepcounter{subsection}
{\newpage
\clearpage
\samepage \begin{tabular}{|c|c|c|p{3.0in}|}
\hline
 & & &\\ 
\sc  ttype
 & \sc tunit
 & \sc tform 
 & \multicolumn{1}{|c|}{Comment}\\ 
 & & &\\ \hline
%
\sc  tg\_r
 & deg
 & \sc 1d $|$ 1e
 & diffraction angle; default form is 1D. \\ \hline
%
\sc  tg\_d
 & deg
 & \sc 1d $|$ 1e
 & cross-dispersion angle; default form is 1D. \\ \hline
%
\sc  tg\_mlam
 & angstrom
 & \sc 1d $|$ 1e
 & $m\times\lambda$ Default form is 1D.\\ \hline
%
\sc  tg\_m
 & 
 & 1I
 & order ($m$) \\ \hline
%
\sc  tg\_lam
 & angstrom
 & \sc 1d $|$ 1e
 & wavelength ($\lambda$) Default form is 1D. \\ \hline
%
\sc  tg\_part
 & 
 & \sc 1i
 & component (HEG, MEG, LEG, \ldots) \\ \hline
%
\sc tg\_smap
 & 
 & \sc 1i
 & source map, for matching ambiguous photons to zero-orders \\ \hline
%
\sc  tg\_srcid
 & 
 & \sc 1i
 & source ID \\ \hline
%
\sc  gdpx
 & pixel
 & \sc 1j
 & grating diffraction pixel,
 dispersion direction\newline
 (optional)\\ \hline
%
\sc  gdpy
  & pixel
  & \sc 1j
  & grating diffraction pixel,
  cross-dispersion\newline
  (optional)\\ \hline
%
\end{tabular}
}

\stepcounter{subsection}
{\newpage
\clearpage
\samepage \begin{tabular}{|c|p{0.65in}|c|p{3.0in}|}
\hline
 & & &\\ 
\sc ttype
 & \sc tunit
 & \sc tform 
 & \multicolumn{1}{|c|}{Comments}\\ 
 & & &\\ \hline
%
\sc spec\_num                          %
 &                             %
 & 1I                                %
 & Required. Spectrum number.    \\ \hline                 %

\sc rowid                             %
 &                                %
 & 64A                             %
 & Optional; Arbitrary string identifier  \\ \hline                     %

\sc  tg\_m                            %
 &                                %
 & 1I                             %
 & Required; diffraction order ($m$) \\ \hline           %

\sc  tg\_part                         %
 &                                %
 & 1I                             %
 & Required; Spectral component (HEG, MEG, LEG, \ldots) \\ \hline%

\sc  tg\_srcid                        %
 &                                %
 & 1I                             %
 & Required; source ID.  If constant (files split by source), then
 this becomes a header keyword: {\tt TG\_SRCID =  $n$}
\\ \hline             %

\sc channel                                %
 &                               %
 & 16384I                                %
 & Required; Vector of spectral ``channel'' numbers.   \\ \hline                    %

\sc counts                                %
 & counts                              %
 & 16384I                              %
 & Required; Counts array (a spectrum).  
  \\ \hline                    %

\sc stat\_err                                %
 & counts                               %
 & 16384E                              %
 & Optional; statistical uncertainty (``error'') on count column.
  \\ \hline                    %

\sc binlo                                %
 &   angstrom                            %
 &   16384D                            %
 &  Required; Bin boundary, low coordinate. \\ %

                               %
 &   degrees                            %
 &   16384D                            %
 & \\ 
%
                               %
 &   mm                            %
 &   16384D                            %
 & \\ 
%
                               %
 &   keV                            %
 &   16384D                            %
 &  \\ 
%
                               %
 &  pixel                            %
 &   16384I                            %
 & 
\\ \hline
%
\sc binhi                                %
 & angstrom                              %
 & 16384D                              %
 & Required; Bin boundary, high coordinate  \\ %

                               %
 &   degrees                            %
 &   16384D                            %
 & \\ 
%
                               %
 &   mm                            %
 &   16384D                            %
 & \\ 
%
                               %
 &   keV                            %
 &   16384D                            %
 & \\ 
%
                               %
 &  pixel                            %
 &   16384I                            %
 &   \\ \hline                    %

\sc flux                                %
 & photons /s /cm**2 / angstrom                              %
 & 16384E                              %
 & Optional; Flux;  ergs or photons per angstrom.  
 \\ \hline                    %

\sc flux\_err                                %
 & (same as FLUX)                              %
 & 16384E                              %
 & Optional. Uncertainty on flux.
 \\ \hline                    %

\end{tabular}
}

\stepcounter{subsubsection}
{\newpage
\clearpage
\samepage \begin{tabular}{|c|p{0.65in}|c|p{3.0in}|}
\hline
 & & &\\ 
\sc ttype
 & \sc tunit
 & \sc tform 
 & \multicolumn{1}{|c|}{Comments}\\ 
 & & &\\ \hline
%
\sc spec\_num                          %
 &                             %
 & 1I                                %
 & Required. Response index.\\ 
\hline                 %

\sc rowid                             %
 &                                %
 & 64A                             %
 & Optional; Arbitrary string identifier  \\ \hline                     %

\sc  tg\_m                            %
 &                                %
 & 1I                             %
 & Required; diffraction order ($m$) \\ \hline           %

\sc  tg\_part                         %
 &                                %
 & 1I                             %
 & Required; Spectral component (HEG, MEG, LEG, \ldots) \\ \hline%

\sc  tg\_srcid                        %
 &                                %
 & 1I                             %
 & Required; source ID of source in spectrum file to which this
 response applies.  If constant (file split on source), then this
 is promoted to a keyword.  If null-valued, then the response is for a region
 for which no source spectrum has been extracted.\\ 
\hline             %

\sc channel                                %
 &                               %
 & 16384I
                                %
 & Required; Vector of spectral ``channel'' numbers.   \\ \hline                    %

\sc specresp                                %
 & cm**2                              %
 & 16384I                              %
 & Required; The spectral response array.  
  \\ \hline                    %

\sc stat\_err                                %
 & cm**2                               %
 & 16384I                              %
 & Optional; statistical uncertainty (``error'') on the response array.
  \\ \hline                    %

\sc binlo                                %
 &   angstrom                            %
 &   16384E                            %
 &  Required; Bin boundary, low coordinate. \\ \hline                    %

\sc binhi                                %
 & angstrom                              %
 & 16384E                              %
 & Required; Bin boundary, high coordinate  \\ \hline                    %


\end{tabular}
}

\stepcounter{subsubsection}
\stepcounter{subsection}
\stepcounter{section}
{\newpage
\clearpage
\samepage \setbox\sizebox=\hbox{$R(\lambda, \beta, \mathrm{PHA})$}\lthtmltypeout{latex2htmlSize :tex2html_wrap_inline253: \the\ht\sizebox::\the\dp\sizebox.}\box\sizebox
}

\stepcounter{section}
\stepcounter{section}
\stepcounter{section}

\end{document}
